From 877a4bb1328661ae2e97d764c26e2bc0ff1f46fe Mon Sep 17 00:00:00 2001
From: Sebastian <sebasjm@gmail.com>
Date: Fri, 7 Apr 2023 18:59:47 -0300
Subject: fix #7743

---
 packages/demobank-ui/src/pages/WithdrawalQRCode.tsx | 3 +--
 1 file changed, 1 insertion(+), 2 deletions(-)

(limited to 'packages/demobank-ui/src/pages/WithdrawalQRCode.tsx')

diff --git a/packages/demobank-ui/src/pages/WithdrawalQRCode.tsx b/packages/demobank-ui/src/pages/WithdrawalQRCode.tsx
index 9c5f83eca..a20b2e90d 100644
--- a/packages/demobank-ui/src/pages/WithdrawalQRCode.tsx
+++ b/packages/demobank-ui/src/pages/WithdrawalQRCode.tsx
@@ -67,7 +67,6 @@ export function WithdrawalQRCode({
     ) {
       return <div>operation not found</div>;
     }
-    console.log("result", result);
     onLoadNotOk();
     return handleNotOkResult(i18n)(result);
   }
@@ -77,7 +76,7 @@ export function WithdrawalQRCode({
   if (data.aborted || data.confirmation_done) {
     // signal that this withdrawal is aborted
     // will redirect to account info
-    notifyInfo(i18n.str`Operation was completed from other session`);
+    notifyInfo(i18n.str`Operation completed`);
     onAborted();
     return <Loading />;
   }
-- 
cgit v1.2.3

