From 5ea22a325c069fe497b2dc8a73d4de69fd8cc27b Mon Sep 17 00:00:00 2001
From: Sebastian <sebasjm@gmail.com>
Date: Fri, 14 Apr 2023 14:07:15 -0300
Subject: using new localStorage api, pageState => settings, notifcation using
 observer api

---
 packages/demobank-ui/src/pages/WithdrawalQRCode.tsx | 11 +++--------
 1 file changed, 3 insertions(+), 8 deletions(-)

(limited to 'packages/demobank-ui/src/pages/WithdrawalQRCode.tsx')

diff --git a/packages/demobank-ui/src/pages/WithdrawalQRCode.tsx b/packages/demobank-ui/src/pages/WithdrawalQRCode.tsx
index a20b2e90d..826578ffc 100644
--- a/packages/demobank-ui/src/pages/WithdrawalQRCode.tsx
+++ b/packages/demobank-ui/src/pages/WithdrawalQRCode.tsx
@@ -21,20 +21,15 @@ import {
 } from "@gnu-taler/taler-util";
 import {
   ErrorType,
-  HttpResponsePaginated,
   useTranslationContext,
 } from "@gnu-taler/web-util/lib/index.browser";
-import { Fragment, h, VNode } from "preact";
+import { Fragment, VNode, h } from "preact";
 import { Loading } from "../components/Loading.js";
-import {
-  ObservedStateType,
-  notifyError,
-  notifyInfo,
-} from "../context/pageState.js";
 import { useWithdrawalDetails } from "../hooks/access.js";
+import { notifyInfo } from "../hooks/notification.js";
+import { handleNotOkResult } from "./HomePage.js";
 import { QrCodeSection } from "./QrCodeSection.js";
 import { WithdrawalConfirmationQuestion } from "./WithdrawalConfirmationQuestion.js";
-import { handleNotOkResult } from "./HomePage.js";
 
 const logger = new Logger("WithdrawalQRCode");
 
-- 
cgit v1.2.3

