From 1723f16b9c4b008e9e44578c2587c7a1bd6560b4 Mon Sep 17 00:00:00 2001
From: Sebastian <sebasjm@gmail.com>
Date: Sat, 25 Feb 2023 19:43:45 -0300
Subject: some fixes afte testing demobank with ms

---
 packages/demobank-ui/src/pages/WithdrawalQRCode.tsx | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

(limited to 'packages/demobank-ui/src/pages/WithdrawalQRCode.tsx')

diff --git a/packages/demobank-ui/src/pages/WithdrawalQRCode.tsx b/packages/demobank-ui/src/pages/WithdrawalQRCode.tsx
index fd91c0e1a..d4c95d830 100644
--- a/packages/demobank-ui/src/pages/WithdrawalQRCode.tsx
+++ b/packages/demobank-ui/src/pages/WithdrawalQRCode.tsx
@@ -33,7 +33,9 @@ interface Props {
   withdrawalId: string;
   talerWithdrawUri: string;
   onAbort: () => void;
-  onLoadNotOk: <T, E>(error: HttpResponsePaginated<T, E>) => VNode;
+  onLoadNotOk: <T>(
+    error: HttpResponsePaginated<T, SandboxBackend.SandboxError>,
+  ) => VNode;
 }
 /**
  * Offer the QR code (and a clickable taler://-link) to
-- 
cgit v1.2.3

