From 1723f16b9c4b008e9e44578c2587c7a1bd6560b4 Mon Sep 17 00:00:00 2001
From: Sebastian <sebasjm@gmail.com>
Date: Sat, 25 Feb 2023 19:43:45 -0300
Subject: some fixes afte testing demobank with ms

---
 packages/demobank-ui/src/pages/PublicHistoriesPage.tsx | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

(limited to 'packages/demobank-ui/src/pages/PublicHistoriesPage.tsx')

diff --git a/packages/demobank-ui/src/pages/PublicHistoriesPage.tsx b/packages/demobank-ui/src/pages/PublicHistoriesPage.tsx
index 54a77b42a..2b5f7e26c 100644
--- a/packages/demobank-ui/src/pages/PublicHistoriesPage.tsx
+++ b/packages/demobank-ui/src/pages/PublicHistoriesPage.tsx
@@ -36,7 +36,9 @@ const logger = new Logger("PublicHistoriesPage");
 // }
 
 interface Props {
-  onLoadNotOk: <T, E>(error: HttpResponsePaginated<T, E>) => VNode;
+  onLoadNotOk: <T>(
+    error: HttpResponsePaginated<T, SandboxBackend.SandboxError>,
+  ) => VNode;
 }
 
 /**
-- 
cgit v1.2.3

