From 0bd47e107c9127561da33719a0a7c6de88c35f2e Mon Sep 17 00:00:00 2001
From: Sebastian <sebasjm@gmail.com>
Date: Fri, 9 Dec 2022 09:09:20 -0300
Subject: copyleft header

---
 packages/demobank-ui/src/components/fields/ImageInput.tsx | 8 ++------
 1 file changed, 2 insertions(+), 6 deletions(-)

(limited to 'packages/demobank-ui/src/components/fields/ImageInput.tsx')

diff --git a/packages/demobank-ui/src/components/fields/ImageInput.tsx b/packages/demobank-ui/src/components/fields/ImageInput.tsx
index c190de9a9..15b25f1c2 100644
--- a/packages/demobank-ui/src/components/fields/ImageInput.tsx
+++ b/packages/demobank-ui/src/components/fields/ImageInput.tsx
@@ -1,6 +1,6 @@
 /*
  This file is part of GNU Taler
- (C) 2021 Taler Systems S.A.
+ (C) 2022 Taler Systems S.A.
 
  GNU Taler is free software; you can redistribute it and/or modify it under the
  terms of the GNU General Public License as published by the Free Software
@@ -14,14 +14,10 @@
  GNU Taler; see the file COPYING.  If not, see <http://www.gnu.org/licenses/>
  */
 
-/**
- *
- * @author Sebastian Javier Marchano (sebasjm)
- */
 import { h, VNode } from "preact";
 import { useLayoutEffect, useRef, useState } from "preact/hooks";
 import emptyImage from "../../assets/empty.png";
-import { TextInputProps } from "./TextInput";
+import { TextInputProps } from "./TextInput.js";
 
 const MAX_IMAGE_UPLOAD_SIZE = 1024 * 1024;
 
-- 
cgit v1.2.3

