From 0ee669f52341a8331394a1e9892264c0ef0bb7d7 Mon Sep 17 00:00:00 2001
From: Florian Dold <florian@dold.me>
Date: Thu, 21 Oct 2021 13:11:17 +0200
Subject: reducer WIP, user error boundaries in UI

---
 packages/anastasis-webui/src/pages/home/SecretSelectionScreen.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/anastasis-webui/src/pages/home/SecretSelectionScreen.tsx')

diff --git a/packages/anastasis-webui/src/pages/home/SecretSelectionScreen.tsx b/packages/anastasis-webui/src/pages/home/SecretSelectionScreen.tsx
index bbdcf8c2e..7cb7fdf20 100644
--- a/packages/anastasis-webui/src/pages/home/SecretSelectionScreen.tsx
+++ b/packages/anastasis-webui/src/pages/home/SecretSelectionScreen.tsx
@@ -57,7 +57,7 @@ export function SecretSelectionScreen(props: RecoveryReducerProps): VNode {
     <AnastasisClientFrame title="Recovery: Select secret">
       <p>Provider: {recoveryDocument.provider_url}</p>
       <p>Secret version: {recoveryDocument.version}</p>
-      <p>Secret name: {recoveryDocument.version}</p>
+      <p>Secret name: {recoveryDocument.secret_name}</p>
       <button onClick={() => setSelectingVersion(true)}>
         Select different secret
       </button>
-- 
cgit v1.2.3

