From ae0a35df2b2934c517954d2a73af4cc6e1734e30 Mon Sep 17 00:00:00 2001
From: Sebastian <sebasjm@gmail.com>
Date: Thu, 4 Nov 2021 15:17:57 -0300
Subject: async, onInput, and some fixes

---
 packages/anastasis-webui/src/pages/home/RecoveryFinishedScreen.tsx | 3 +++
 1 file changed, 3 insertions(+)

(limited to 'packages/anastasis-webui/src/pages/home/RecoveryFinishedScreen.tsx')

diff --git a/packages/anastasis-webui/src/pages/home/RecoveryFinishedScreen.tsx b/packages/anastasis-webui/src/pages/home/RecoveryFinishedScreen.tsx
index bbcaa10a5..3740592b1 100644
--- a/packages/anastasis-webui/src/pages/home/RecoveryFinishedScreen.tsx
+++ b/packages/anastasis-webui/src/pages/home/RecoveryFinishedScreen.tsx
@@ -29,6 +29,9 @@ export function RecoveryFinishedScreen(): VNode {
       <p>
         Secret: {secret}
       </p>
+      <div style={{ marginTop: '2em', display: 'flex', justifyContent: 'space-between' }}>
+        <button class="button" onClick={() => reducer.back()}>Back</button>
+      </div>
     </AnastasisClientFrame>
   );
 }
-- 
cgit v1.2.3

