From bbde2a9bb9fcb8d008b67a4382b15864a9ef2e9b Mon Sep 17 00:00:00 2001
From: Sebastian <sebasjm@gmail.com>
Date: Mon, 3 Oct 2022 18:26:37 -0300
Subject: fix: showing start again in the last main screen

---
 .../src/pages/home/BackupFinishedScreen.tsx             | 17 +++++++++++++++++
 1 file changed, 17 insertions(+)

(limited to 'packages/anastasis-webui/src/pages/home/BackupFinishedScreen.tsx')

diff --git a/packages/anastasis-webui/src/pages/home/BackupFinishedScreen.tsx b/packages/anastasis-webui/src/pages/home/BackupFinishedScreen.tsx
index d69a0af38..9b63c9887 100644
--- a/packages/anastasis-webui/src/pages/home/BackupFinishedScreen.tsx
+++ b/packages/anastasis-webui/src/pages/home/BackupFinishedScreen.tsx
@@ -57,6 +57,23 @@ export function BackupFinishedScreen(): VNode {
               </div>
             );
           })}
+          <div
+            style={{
+              display: "flex",
+              justifyContent: "center",
+            }}
+          >
+            <p>
+              <div class="buttons ml-4">
+                <button
+                  class="button is-primary is-right"
+                  onClick={() => reducer.reset()}
+                >
+                  Start again
+                </button>
+              </div>
+            </p>
+          </div>
         </div>
       )}
     </AnastasisClientFrame>
-- 
cgit v1.2.3

