From aac2bc389a32b2e91494d097a3f3fc9560ddbfbc Mon Sep 17 00:00:00 2001
From: Sebastian <sebasjm@gmail.com>
Date: Tue, 19 Oct 2021 11:17:54 -0300
Subject: fix some building errors

---
 packages/anastasis-webui/src/pages/home/AttributeEntryScreen.tsx | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'packages/anastasis-webui/src/pages/home/AttributeEntryScreen.tsx')

diff --git a/packages/anastasis-webui/src/pages/home/AttributeEntryScreen.tsx b/packages/anastasis-webui/src/pages/home/AttributeEntryScreen.tsx
index 4df99db9a..6f87a3358 100644
--- a/packages/anastasis-webui/src/pages/home/AttributeEntryScreen.tsx
+++ b/packages/anastasis-webui/src/pages/home/AttributeEntryScreen.tsx
@@ -1,7 +1,8 @@
 /* eslint-disable @typescript-eslint/camelcase */
 import { h, VNode } from "preact";
 import { useState } from "preact/hooks";
-import { AnastasisReducerApi, ReducerStateRecovery, ReducerStateBackup } from "../../hooks/use-anastasis-reducer";
+import { ReducerStateRecovery, ReducerStateBackup } from "../../../../anastasis-core/lib";
+import { AnastasisReducerApi } from "../../hooks/use-anastasis-reducer";
 import { AnastasisClientFrame, withProcessLabel, LabeledInput } from "./index";
 
 export function AttributeEntryScreen(props: AttributeEntryProps): VNode {
-- 
cgit v1.2.3

