From 6d06b52605005f4d25381fc73383c3c9e48f20f8 Mon Sep 17 00:00:00 2001
From: Sebastian <sebasjm@gmail.com>
Date: Sat, 11 Jun 2022 19:10:26 -0300
Subject: add testing to web components

---
 .../anastasis-webui/src/components/InvalidState.tsx | 21 +++++++++++++++++++++
 1 file changed, 21 insertions(+)
 create mode 100644 packages/anastasis-webui/src/components/InvalidState.tsx

(limited to 'packages/anastasis-webui/src/components/InvalidState.tsx')

diff --git a/packages/anastasis-webui/src/components/InvalidState.tsx b/packages/anastasis-webui/src/components/InvalidState.tsx
new file mode 100644
index 000000000..8e2edde5e
--- /dev/null
+++ b/packages/anastasis-webui/src/components/InvalidState.tsx
@@ -0,0 +1,21 @@
+/*
+ This file is part of GNU Anastasis
+ (C) 2021-2022 Anastasis SARL
+
+ GNU Anastasis is free software; you can redistribute it and/or modify it under the
+ terms of the GNU Affero General Public License as published by the Free Software
+ Foundation; either version 3, or (at your option) any later version.
+
+ GNU Anastasis is distributed in the hope that it will be useful, but WITHOUT ANY
+ WARRANTY; without even the implied warranty of MERCHANTABILITY or FITNESS FOR
+ A PARTICULAR PURPOSE.  See the GNU Affero General Public License for more details.
+
+ You should have received a copy of the GNU Affero General Public License along with
+ GNU Anastasis; see the file COPYING.  If not, see <http://www.gnu.org/licenses/>
+ */
+
+import { h, VNode } from "preact";
+
+export default function InvalidState(): VNode {
+  return <div>invalid state</div>;
+}
-- 
cgit v1.2.3

